-2.5 -2 -1.5 -1 -0.5 0 0.5 1 1.5 0

10

20 ADCP oc415 7ens edited, npts = 179

phase

0.99 1 1.01 1.02 1.03 1.04 1.05 1.06 0 10 20 30

amplitude

190 200 210 220 230 240 250 260 -20

0

20

days time: nav - pc

-15 -10 -5 0 5 10 15 0

20

40

time: nav - pc

2005- 9- 9 13:14