25.5

2626.5

27S6.57.58.5

T

01126339.dat 13.5-14.3m 46 pts

Run Length: 18.2/7 xi: 0.03 L_T/L_{rr}: 0.43

20.4

20.6

20.8

21σ_θ1313.5

1414.5

Pressure (dBar)

26.8

26.85

26.9

26.95

2727.05

S6.66.76.86.97

T

01126339.dat 14.7-16.5m 109 pts

Run Length: 47.7/7 xi: 0.23 L_T/L_{rr}: 0.45

20.7

20.9

2121.1

21.2σ_θ14151617

27.1

27.15

S6.55

6.66.65

6.76.75

T

01126339.dat 17.0-17.8m 42 pts

Run Length: 13.8/7 xi: 0.22 L_T/L_{rr}: 0.39

21.18

21.2

21.22

21.24

21.26σ_θ16.5

1717.5 18

27.07

27.08

27.09

27.1

27.11

27.12

S6.546.566.586.66.626.64

T

01126339.dat 17.8-18.3m 27 pts

Run Length: 7.1/7 xi: 0.18 L_T/L_{rr}: 0.49

21.2

21.22

21.24

21.26

21.28σ_θ17.6

17.8

1818.2

18.4

18.6

Pressure (dBar)

27.15

27.2

27.25

27.3

S6.35

6.46.45

6.56.55 6.6

T

01126339.dat 18.5-20.1m 103 pts

Run Length: 29.0/7 xi: 0.07 L_T/L_{rr}: 0.44

21.3

21.4

21.5σ_θ1818.5

1919.5

2020.5

27.35

27.4

S6.16.26.36.46.5

T

01126339.dat 20.2-20.8m 37 pts

Run Length: 14.0/7 xi: 0.04 L_T/L_{rr}: 0.40

21.35

21.45

21.5

21.55σ_θ2020.2

20.4

20.6

20.8 21

27.25

27.3

27.35

27.4

27.45

27.5

S6.16.26.36.4

T

01126339.dat 20.8-21.5m 38 pts

Run Length: 16.6/7 xi: 0.05 L_T/L_{rr}: 0.41

21.4

21.45

21.5

21.55

21.6σ_θ20.5

2121.5 22

Pressure (dBar)

29.34

29.36

29.38

29.4

S3.33.35

3.43.45

T

01126339.dat 35.9-37.3m 87 pts

Run Length: 32.1/7 xi: 0.38 L_T/L_{rr}: 0.37

23.32

23.34

23.36

23.38

23.4

23.42σ_θ35.5

3636.5

3737.5 38 29.5

29.6

29.7

29.8

29.9

S2.62.83.23.4

T

01126339.dat 38.3-39.0m 41 pts

Run Length: 9.7/7 xi: 0.20 L_T/L_{rr}: 0.30

23.5

23.6

23.7

23.8σ_θ38.2

38.4

38.6

38.8

3939.2

31.08

31.1

31.12

31.14

31.16

31.18

S0.80.850.90.95

T

01126339.dat 46.5-50.1m 214 pts

Run Length: 23.4/7 xi: 0.38 L_T/L_{rr}: 0.19

24.9

24.92

24.94

24.96

24.98σ_θ4446485052

Pressure (dBar)

31.13

31.15

31.17

S0.80.82

0.84

0.86

T

01126339.dat 50.1-51.4m 82 pts

Run Length: 23.6/7 xi: 0.20 L_T/L_{rr}: 0.42

24.95

24.97

24.98σ_θ49.5

5050.5

5151.5 52 31.155

31.165

S0.805

0.81

0.815

0.82

0.825

0.83

T

01126339.dat 51.4-51.8m 24 pts

Run Length: 7.4/7 xi: 0.33 L_T/L_{rr}: 0.46

24.98

24.99σ_θ51.2

51.4

51.6

51.8