35.8 36 36.2 36.4 36.6 36.8 13 14 15 16 17 18 19 20 21

salinity (psu) temperature (C)

oc415-027 oc404-009

25.5 26 26.5 27 27.5 3 3.5 4 4.5 5 5.5 6

potential density oxygen (ml/l)

25.5 26 26.5 27 27.5 50 60 70 80 90 100 110

potential density oxygen saturation (%)