5 10 15 20 25

-1500

-1000

-500

temperature (C) pressure (db)

415-027 404-009 35 35.5 36 36.5

-1500

-1000

-500

0

salinity (psu)

3.5 4 4.5 5 5.5

-1500

-1000

-500

0

oxygen (ml/l)

60 80 100

-1500

-1000

-500

0

oxygen saturation (%)