Winkler Oxygen (ml/l)

3 3.5 4 4.5 5 5.5

-66.4 -66.2 -66 -65.8 -65.6 -65.4

100 200 300 400 500 600 700

Depth

Longitude

4.5

5

5.5

-66.4 -66.2 -66 -65.8 -65.6 -65.4

0 50 100 150 200 250 Longitude