3 4 5 6

0

200

400

600

800 Winkler O_2 (ml/l)

Depth (m)

Cast 19

3 4 5 6

0

200

400

600

800 Winkler O_2 (ml/l)

Cast 20

3 4 5 6

0

200

400

600

800 Winkler O_2 (ml/l)

Cast 22

3 4 5 6

0

200

400

600

800 Winkler O_2 (ml/l)

Cast 18

Winkler Oxygen for eddy A4, June 2005

3 4 5 6

0

200

400

600

800 Winkler O_2 (ml/l)

Cast 17