Bottle ChlA ( μg/l)

0 0.1 0.2 0.3

-66 -65.5 -65 -64.5

0

50

100

Depth

Longitude

Bottle Phaeo (

0 0.1 0.2 0.3

-66 -65.5 -65 -64.5

0

50

100

Longitude

Bottle Chla+Phaeo (

0 0.2 0.4 0.6

-66 -65.5 -65 -64.5

0

50

100

Longitude