-3-2-10123

01020 30 ADCP oc440 7ens edited, npts = 178 phase 0.970.980.9911.011.021.031.041.051.06

01020 30 amplitude 281282283284285286287288289290291

-40-200 20 days time: nav - pc

-25-20-15-10-5051015

01020 30 time: nav - pc

2007-10-18 9:49