281 282 283 284 285 286 287 288 289 290 291

-100

-50

0

50

100

days phase

ADCP oc440 7ens unedited, npts = 220

-1 0 1 2 3 4 amplitude

281 282 283 284 285 286 287 288 289 290 291 -3 -2 -1 0 1 2 3

days

ADCP oc440 7ens edited, npts = 178

0.95

1

1.05

2007-10-18 9:49