288 288.5 289 289.5 290

0.995 1 1.005

1.01 scale

ADCP oc440 step size 1

288 288.5 289 289.5 290

-0.2 0 0.2 0.4 0.6 0.8

Angle

288 288.5 289 289.5 290 -5 0 5

Speed

288 288.5 289 289.5 290

-180 -90 0 90 180

Heading 2007/10/18 09:49:07 btcaluv.m step: 1, mean ph: 0.2732, amp: 1.0016

288 288.5 289 289.5 290

0 2000 4000 6000

Depth

Decimal Day