156 158 160 162 164 166 168

-100

-50

0

50

100

days phase

ADCP oc425a 7ens unedited, npts = 221

-10 0 10 20 30 40 50 amplitude

156 158 160 162 164 166 168 -4

-2

0

2

4

days

ADCP oc425a 7ens edited, npts = 160

0.95

1

1.05

2006- 6-17 8: 4