1993 1994 1995 1996 1997 1998 0

20

40

60

80

100 NO ERS DATA

NRMS=27.6%

NRMS difference (%)

1993 1994 1995 1996 1997 1998 -20

-10

0

10

20

30

Predicted ΔD (cm)

Time (years)

simulated (QG model) observed (CTD)

-40 -20 0 20 40 -40 -30 -20 -10 0 10 20 30 40 50

Observed SLA (cm)

Predicted SLA (cm)

RMS=6.5 cm

r=0.89 a=1.67 b=0.70

-40 -20 0 20 40 -40 -30 -20 -10 0 10 20 30 40 50

Observed ΔD (cm)

Predicted

ΔD (cm)

RMS=6.1 cm

r=0.73 a=-0.41 b=0.69

(a)

(b)

(c)

(d)