-20 -16 -12 -8 -4 0 4 8 12 16 20

-65 -64 -63 -62 31 31.5 32 32.5 33 33.5

BATS

Latitude (deg N)

Predicted SLA (cm)

-20 -16 -12 -8 -4 0 4 8 12 16 20

-65 -64 -63 -62 31 31.5 32 32.5 33 33.5

BATS

Observed SLA (cm)

-20 -16 -12 -8 -4 0 4 8 12 16 20

-65 -64 -63 -62 31 31.5 32 32.5 33 33.5

BATS

Longitude (deg E)

SLA Difference (cm)

93 94 95 96 97 98 0 2 4 6 8 10 NO ERS DATA

Time (Years)

RMS Diff (cm)

31-Oct-1995