-20 0 20 -30 -20 -10 0 10 20 30

Reference SLA

Predicted SLA

1 day updating

RMS=0.45 cm

a=0.0049 b=0.99 r=1.00

-20 0 20 -30 -20 -10 0 10 20 30

Reference SLA

4 day updating

RMS=0.51 cm

a=-0.029 b=0.97 r=1.00

-20 0 20 -30 -20 -10 0 10 20 30

Reference SLA

10 day updating

RMS=1.44 cm

r=0.98 a=-0.25 b=0.83

(a) (b) (c)