-0.5 0 0.5

-4000

-3500

-3000

-2500

-2000

-1500

-1000

-500

0

Amplitude mode 1 (97.9%) mode 2 (1.4%) mode 3 (0.4%)

0 100 200 300

-4000

-3500

-3000

-2500

-2000

-1500

-1000

-500

0

DH (cm)

26 26.5 27 27.5 28

-4000

-3500

-3000

-2500

-2000

-1500

-1000

-500

0

Sigma-t

Depth (m)

N^2 x 10^5 (s^{- 1})

Sigma-t N^2

4.5

1.5 3.0

(a) (b) (c)