0.5 1 1.5 2 2.5 3 3.5 25 30 35 40 45

NMRS Diff (%) beta=0.25 beta=0.5 beta=1.0 central run

0.5 1 1.5 2 2.5 3 3.5 6 6.5 7 7.5 8

RMS (cm)

Predicted vs ERS

0.5 1 1.5 2 2.5 3 3.5 6 7 8 9 Predicted vs CTD

0.5 1 1.5 2 2.5 3 3.5 0.8 0.85 0.9 0.95

CORR COEF

0.5 1 1.5 2 2.5 3 3.5 0.4 0.5 0.6 0.7 0.8

0.5 1 1.5 2 2.5 3 3.5 0.6 0.65 0.7 0.75 0.8

B (inclnation)

Alpha

0.5 1 1.5 2 2.5 3 3.5 0.5 0.6 0.7 0.8

Alpha

(a)

(b)

(c)

(d)

(e)

(f)

(g)