1993 1994 1995 1996 1997 1998

20 40 60 80 100

Boundary grid point number

Unfiltered Vorticity (sec^{- 1}) h = 100m

-50 -40 -30 -20 -10 0 10 20 30

1993 1994 1995 1996 1997 1998

20 40 60 80 100 Filtered Vorticity (sec^{- 1})

Time (years)