132 134 136 138 140

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15

Velocity (m/s)

Mooring I, u1: rms error=0.093256 m/s

Obs U Mod U

132 134 136 138 140

-0.3

-0.2

-0.1

0

0.1

0.2 v, bias:0.039112-0.012107i

Obs V Mod V

132 134 136 138 140

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15

Mooring I, u2: rms error=0.080124 m/s

Obs U Mod U

132 134 136 138 140

-0.3

-0.2

-0.1

0

0.1

0.2 v, bias:0.016972-0.031498i

Obs V Mod V

132 134 136 138 140

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15

Mooring I, u3: rms error=0.078512 m/s

Time (ydgmt0)

Obs U Mod U

132 134 136 138 140

-0.3

-0.2

-0.1

0

0.1

0.2 v, bias:0.035918-0.015379i

Time (ydgmt0)

Obs V Mod V