131 132 133 134 135

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15

Velocity (m/s)

Mooring I, u1: rms error=0.097496 m/s

Obs U Mod U

131 132 133 134 135

-0.3

-0.2

-0.1

0

0.1

0.2 v, bias:0.050446-0.002487i

Obs V Mod V

131 132 133 134 135

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15

Mooring I, u2: rms error=0.093453 m/s

Obs U Mod U

131 132 133 134 135

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 v, bias:0.043029-0.0095115i

Obs V Mod V

131 132 133 134 135

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15

Mooring I, u3: rms error=0.092234 m/s

Time (ydgmt0)

Obs U Mod U

131 132 133 134 135

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 v, bias:0.038142-0.013668i

Time (ydgmt0)

Obs V Mod V