138 140 142 144 146 148

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8

Velocity (m/s)

ADCP u 1: rms error=0.085882 m/s

Obs U Mod U

138 140 142 144 146 148 -1

-0.5

0

0.5

1 v, bias:-0.00072862+0.0092335i

Obs V Mod V

138 140 142 144 146 148

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 ADCP u 2: rms error=0.079191 m/s

Obs U Mod U

138 140 142 144 146 148 -1

-0.5

0

0.5

1 v, bias:-0.0014616+0.0029469i

Obs V Mod V

138 140 142 144 146 148

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 ADCP u 3: rms error=0.077562 m/s

Time (ydgmt0)

Obs U Mod U

138 140 142 144 146 148 -1

-0.5

0

0.5

1 v, bias:-0.0058005-0.00035426i

Time (ydgmt0)

Obs V Mod V