138 140 142 144 146

-0.1

-0.05

0

0.05

0.1

Velocity (m/s)

Mooring B, u 1: rms error=0.08643 m/s

Obs U Mod U

138 140 142 144 146

-0.25

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 v, bias:0.038481+0.053177i

Obs V Mod V

138 140 142 144 146

-0.1

-0.05

0

0.05

0.1 Mooring B, u 2: rms error=0.082593 m/s

Obs U Mod U

138 140 142 144 146

-0.25

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 v, bias:0.035811+0.048732i

Obs V Mod V

138 140 142 144 146

-0.1

-0.05

0

0.05

0.1 Mooring B, u 3: rms error=0.078287 m/s

Time (ydgmt0)

Obs U Mod U

138 140 142 144 146

-0.25

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 v, bias:0.030757+0.042016i

Time (ydgmt0)

Obs V Mod V