138 140 142 144 146 148

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8

Velocity (m/s)

ADCP u 1: rms error=0.082974 m/s

Obs U Mod U

138 140 142 144 146 148

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 v, bias:-0.0017849+0.0094478i

Obs V Mod V

138 140 142 144 146 148

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 ADCP u 2: rms error=0.075372 m/s

Obs U Mod U

138 140 142 144 146 148

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 v, bias:-0.0038825-0.0065965i

Obs V Mod V

138 140 142 144 146 148

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 ADCP u 3: rms error=0.076492 m/s

Time (ydgmt0)

Obs U Mod U

138 140 142 144 146 148

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 v, bias:-0.004327+6.9937e-05i

Time (ydgmt0)

Obs V Mod V