138 140 142 144 146

-0.1

-0.05

0

0.05

0.1

Velocity (m/s)

Mooring B, u 1: rms error=0.077044 m/s

Obs U Mod U

138 140 142 144 146

-0.25

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 v, bias:0.011053-0.010696i

Obs V Mod V

138 140 142 144 146

-0.1

-0.05

0

0.05

0.1 Mooring B, u 2: rms error=0.071513 m/s

Obs U Mod U

138 140 142 144 146

-0.25

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 v, bias:0.01934+0.0061227i

Obs V Mod V

138 140 142 144 146

-0.1

-0.05

0

0.05

0.1 Mooring B, u 3: rms error=0.072352 m/s

Time (ydgmt0)

Obs U Mod U

138 140 142 144 146

-0.25

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 v, bias:0.02029+0.0085523i

Time (ydgmt0)

Obs V Mod V