136 138 140 142 144 146

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15

Velocity (m/s)

Mooring I, u1: rms error=0.086396 m/s

Obs U Mod U

136 138 140 142 144 146

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 v, bias:0.037102-0.0070848i

Obs V Mod V

136 138 140 142 144 146

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15

Mooring I, u2: rms error=0.077607 m/s

Obs U Mod U

136 138 140 142 144 146

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 v, bias:0.030657-0.011226i

Obs V Mod V

136 138 140 142 144 146

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15

Mooring I, u3: rms error=0.072328 m/s

Time (ydgmt0)

Obs U Mod U

136 138 140 142 144 146

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 v, bias:0.022608-0.01417i

Time (ydgmt0)

Obs V Mod V