138 140 142 144 146

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8

Velocity (m/s)

ADCP u 1: rms error=0.085322 m/s

Obs U Mod U

138 140 142 144 146

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 v, bias:-0.0013994+0.011461i

Obs V Mod V

138 140 142 144 146

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 ADCP u 2: rms error=0.078632 m/s

Obs U Mod U

138 140 142 144 146

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 v, bias:-0.0065739+0.0047604i

Obs V Mod V

138 140 142 144 146

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 ADCP u 3: rms error=0.077636 m/s

Time (ydgmt0)

Obs U Mod U

138 140 142 144 146

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 v, bias:-0.0073303+0.0022064i

Time (ydgmt0)

Obs V Mod V