138 140 142 144 146 148

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8

Velocity (m/s)

ADCP u 1: rms error=0.09003 m/s

Obs U Mod U

138 140 142 144 146 148

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 v, bias:-0.0289-0.0040673i

Obs V Mod V

138 140 142 144 146 148

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 ADCP u 2: rms error=0.080067 m/s

Obs U Mod U

138 140 142 144 146 148

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 v, bias:-0.0097225-0.0091982i

Obs V Mod V

138 140 142 144 146 148

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 ADCP u 3: rms error=0.078311 m/s

Time (ydgmt0)

Obs U Mod U

138 140 142 144 146 148

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 v, bias:-0.0025835-0.0069652i

Time (ydgmt0)

Obs V Mod V