136 138 140 142 144 146

-0.1

-0.05

0

0.05

0.1

Velocity (m/s)

Mooring B, u 1: rms error=0.072457 m/s

Obs U Mod U

136 138 140 142 144 146

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15 v, bias:0.0080383-0.022791i

Obs V Mod V

136 138 140 142 144 146

-0.1

-0.05

0

0.05

0.1 Mooring B, u 2: rms error=0.071734 m/s

Obs U Mod U

136 138 140 142 144 146

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15 v, bias:0.015409-0.005366i

Obs V Mod V

136 138 140 142 144 146

-0.1

-0.05

0

0.05

0.1 Mooring B, u 3: rms error=0.071827 m/s

Time (ydgmt0)

Obs U Mod U

136 138 140 142 144 146

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15 v, bias:0.017037-0.0012688i

Time (ydgmt0)

Obs V Mod V