138 140 142 144 146

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8

Velocity (m/s)

ADCP u 1: rms error=0.093539 m/s

Obs U Mod U

138 140 142 144 146

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 v, bias:-0.03145-0.0037984i

Obs V Mod V

138 140 142 144 146

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 ADCP u 2: rms error=0.083664 m/s

Obs U Mod U

138 140 142 144 146

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 v, bias:-0.0095802+0.0016935i

Obs V Mod V

138 140 142 144 146

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 ADCP u 3: rms error=0.082577 m/s

Time (ydgmt0)

Obs U Mod U

138 140 142 144 146

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 v, bias:-0.0040784+0.0012065i

Time (ydgmt0)

Obs V Mod V