138 140 142 144 146

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8

Velocity (m/s)

ADCP u 1: rms error=0.092048 m/s

Obs U Mod U

138 140 142 144 146

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 v, bias:-0.027804-0.00012103i

Obs V Mod V

138 140 142 144 146

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 ADCP u 2: rms error=0.077286 m/s

Obs U Mod U

138 140 142 144 146

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 v, bias:-0.0055584-0.0043266i

Obs V Mod V

138 140 142 144 146

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 ADCP u 3: rms error=0.073186 m/s

Time (ydgmt0)

Obs U Mod U

138 140 142 144 146

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 v, bias:-0.0015011-0.0028307i

Time (ydgmt0)

Obs V Mod V