138 140 142 144 146

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8

Velocity (m/s)

ADCP u 1: rms error=0.085319 m/s

Obs U Mod U

138 140 142 144 146

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 v, bias:-0.0014158+0.011455i

Obs V Mod V

138 140 142 144 146

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 ADCP u 2: rms error=0.07609 m/s

Obs U Mod U

138 140 142 144 146

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 v, bias:-0.00635-0.0055207i

Obs V Mod V

138 140 142 144 146

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 ADCP u 3: rms error=0.072863 m/s

Time (ydgmt0)

Obs U Mod U

138 140 142 144 146

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 v, bias:-0.008495-0.0037853i

Time (ydgmt0)

Obs V Mod V