138 140 142 144

-0.3

-0.2

-0.1

0

0.1

0.2

Velocity (m/s)

ADCP u 1: rms error=0.083434 m/s

Obs U Mod U

138 140 142 144

-0.4

-0.2

0

0.2

0.4 v, bias:0.014151+0.0056935i

Obs V Mod V

138 140 142 144

-0.3

-0.2

-0.1

0

0.1

0.2 ADCP u 2: rms error=0.068973 m/s

Obs U Mod U

138 140 142 144

-0.4

-0.2

0

0.2

0.4 v, bias:-0.0045077+0.0060141i

Obs V Mod V

138 140 142 144

-0.3

-0.2

-0.1

0

0.1

0.2 ADCP u 3: rms error=0.066564 m/s

Time (ydgmt0)

Obs U Mod U

138 140 142 144

-0.4

-0.2

0

0.2

0.4 v, bias:-0.005781+0.0053272i

Time (ydgmt0)

Obs V Mod V