134 136 138 140 142 144

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15

Velocity (m/s)

Mooring I, u1: rms error=0.089598 m/s

Obs U Mod U

134 136 138 140 142 144

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 v, bias:0.049066+0.0027588i

Obs V Mod V

134 136 138 140 142 144

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15

Mooring I, u2: rms error=0.084122 m/s

Obs U Mod U

134 136 138 140 142 144

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 v, bias:0.048629+0.0015528i

Obs V Mod V

134 136 138 140 142 144

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15

Mooring I, u3: rms error=0.081485 m/s

Time (ydgmt0)

Obs U Mod U

134 136 138 140 142 144

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 v, bias:0.044784-0.00053619i

Time (ydgmt0)

Obs V Mod V