138 140 142 144

-0.3

-0.2

-0.1

0

0.1

0.2

Velocity (m/s)

ADCP u 1: rms error=0.083431 m/s

Obs U Mod U

138 140 142 144

-0.4

-0.2

0

0.2

0.4 v, bias:0.014138+0.0056209i

Obs V Mod V

138 140 142 144

-0.3

-0.2

-0.1

0

0.1

0.2 ADCP u 2: rms error=0.07241 m/s

Obs U Mod U

138 140 142 144

-0.4

-0.2

0

0.2

0.4 v, bias:-0.011206+0.00093923i

Obs V Mod V

138 140 142 144

-0.3

-0.2

-0.1

0

0.1

0.2 ADCP u 3: rms error=0.061834 m/s

Time (ydgmt0)

Obs U Mod U

138 140 142 144

-0.4

-0.2

0

0.2

0.4 v, bias:-0.0034659-0.00088235i

Time (ydgmt0)

Obs V Mod V