138 140 142 144

-0.3

-0.2

-0.1

0

0.1

0.2

Velocity (m/s)

ADCP u 1: rms error=0.07374 m/s

Obs U Mod U

138 140 142 144

-0.4

-0.2

0

0.2

0.4 v, bias:-0.0038808+0.014441i

Obs V Mod V

138 140 142 144

-0.3

-0.2

-0.1

0

0.1

0.2 ADCP u 2: rms error=0.058008 m/s

Obs U Mod U

138 140 142 144

-0.4

-0.2

0

0.2

0.4 v, bias:-0.0073129-0.0064598i

Obs V Mod V

138 140 142 144

-0.3

-0.2

-0.1

0

0.1

0.2 ADCP u 3: rms error=0.052974 m/s

Time (ydgmt0)

Obs U Mod U

138 140 142 144

-0.4

-0.2

0

0.2

0.4 v, bias:-0.0072924-0.0030722i

Time (ydgmt0)

Obs V Mod V