134 136 138 140 142 144

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15

Velocity (m/s)

Mooring I, u1: rms error=0.085945 m/s

Obs U Mod U

134 136 138 140 142 144

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 v, bias:0.03961-0.0075523i

Obs V Mod V

134 136 138 140 142 144

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15

Mooring I, u2: rms error=0.077584 m/s

Obs U Mod U

134 136 138 140 142 144

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 v, bias:0.028304-0.014994i

Obs V Mod V

134 136 138 140 142 144

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15

Mooring I, u3: rms error=0.074309 m/s

Time (ydgmt0)

Obs U Mod U

134 136 138 140 142 144

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 v, bias:0.020685-0.019665i

Time (ydgmt0)

Obs V Mod V