138 140 142 144

-0.3

-0.2

-0.1

0

0.1

0.2

Velocity (m/s)

ADCP u 1: rms error=0.073838 m/s

Obs U Mod U

138 140 142 144

-0.4

-0.2

0

0.2

0.4 v, bias:-0.0037673+0.014538i

Obs V Mod V

138 140 142 144

-0.3

-0.2

-0.1

0

0.1

0.2 ADCP u 2: rms error=0.062237 m/s

Obs U Mod U

138 140 142 144

-0.4

-0.2

0

0.2

0.4 v, bias:-0.010156+0.0050145i

Obs V Mod V

138 140 142 144

-0.3

-0.2

-0.1

0

0.1

0.2 ADCP u 3: rms error=0.060248 m/s

Time (ydgmt0)

Obs U Mod U

138 140 142 144

-0.4

-0.2

0

0.2

0.4 v, bias:-0.0098208+0.0016302i

Time (ydgmt0)

Obs V Mod V