134 136 138 140 142

-0.1

-0.05

0

0.05

0.1

Velocity (m/s)

Mooring B, u 1: rms error=0.074044 m/s

Obs U Mod U

134 136 138 140 142

-0.2

-0.15

-0.1

-0.05

0

0.05 v, bias:0.030769+0.033603i

Obs V Mod V

134 136 138 140 142

-0.1

-0.05

0

0.05

0.1 Mooring B, u 2: rms error=0.065771 m/s

Obs U Mod U

134 136 138 140 142

-0.2

-0.15

-0.1

-0.05

0

0.05 v, bias:0.02306+0.033054i

Obs V Mod V

134 136 138 140 142

-0.1

-0.05

0

0.05

0.1 Mooring B, u 3: rms error=0.058117 m/s

Time (ydgmt0)

Obs U Mod U

134 136 138 140 142

-0.2

-0.15

-0.1

-0.05

0

0.05 v, bias:0.012818+0.02602i

Time (ydgmt0)

Obs V Mod V