134 136 138 140 142

-0.1

-0.05

0

0.05

0.1

Velocity (m/s)

Mooring B, u 1: rms error=0.089988 m/s

Obs U Mod U

134 136 138 140 142

-0.25

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 v, bias:0.035313+0.062994i

Obs V Mod V

132 134 136 138 140 142

-0.15

-0.1

-0.05 0 0.05 0.1 0.15 0.2 Mooring B, u 2: rms error=0.076698 m/s

Obs U Mod U

132 134 136 138 140 142

-0.15

-0.1

-0.05 0 0.05 0.1 0.15 0.2 v, bias:-0.0087104-0.045789i

Obs V Mod V

132 134 136 138 140 142

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15

Mooring B, u 3: rms error=0.072687 m/s

Time (ydgmt0)

Obs U Mod U

132 134 136 138 140 142

-0.3

-0.2

-0.1

0

0.1

0.2 v, bias:0.022212+0.03881i

Time (ydgmt0)

Obs V Mod V