134 136 138 140 142

-0.2

-0.15

-0.1

-0.05

0

0.05

Velocity (m/s)

Mooring E, u 1: rms error=0.063839 m/s

Obs U Mod U

134 136 138 140 142

-0.15

-0.1

-0.05

0

0.05

0.1 v, bias:0.033426-0.0079827i

Obs V Mod V

134 136 138 140 142

-0.15

-0.1

-0.05

0

0.05

0.1 Mooring E, u 2: rms error=0.071983 m/s

Obs U Mod U

134 136 138 140 142

-0.15

-0.1

-0.05

0

0.05

0.1 v, bias:-0.048239-0.010265i

Obs V Mod V

134 136 138 140 142

-0.15

-0.1

-0.05

0

0.05

Mooring E, u 3: rms error=0.056926 m/s

Time (ydgmt0)

Obs U Mod U

134 136 138 140 142

-0.15

-0.1

-0.05

0

0.05

0.1 v, bias:0.022534-0.0090923i

Time (ydgmt0)

Obs V Mod V