132 134 136 138 140 142

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15

Velocity (m/s)

Mooring I, u1: rms error=0.088784 m/s

Obs U Mod U

132 134 136 138 140 142

-0.3

-0.2

-0.1

0

0.1

0.2 v, bias:0.03524-0.010588i

Obs V Mod V

132 134 136 138 140 142

-0.15

-0.1

-0.05

0

0.05

0.1 Mooring I, u2: rms error=0.074814 m/s

Obs U Mod U

132 134 136 138 140 142

-0.3

-0.2

-0.1

0

0.1

0.2 v, bias:0.012768-0.027608i

Obs V Mod V

132 134 136 138 140 142

-0.15

-0.1

-0.05

0

0.05

0.1 Mooring I, u3: rms error=0.073865 m/s

Time (ydgmt0)

Obs U Mod U

132 134 136 138 140 142

-0.3

-0.2

-0.1

0

0.1

0.2 v, bias:0.034093-0.011834i

Time (ydgmt0)

Obs V Mod V