139 139.5 140 140.5

-0.15

-0.1

-0.05 0 0.05 0.1

Velocity (m/s)

ADCP u 1: rms error=0.069762 m/s Obs U Mod U

139 139.5 140 140.5

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15 v, bias:-0.0038217+0.0048616i Obs V Mod V