146 148 150 152 154 156

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15

Velocity (m/s)

Mooring I, u1: rms error=0.10708 m/s Obs U Mod U

146 148 150 152 154 156

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 v, bias:-0.074701-0.062838i Obs V Mod V

146 148 150 152 154 156

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15

Mooring I, u2: rms error=0.098073 m/s Obs U Mod U

146 148 150 152 154 156

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 v, bias:-0.069356-0.058572i Obs V Mod V