146 148 150 152 154 156

-0.25

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1

Velocity (m/s)

Mooring E, u 1: rms error=0.06172 m/s Obs U Mod U

146 148 150 152 154 156

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15 v, bias:-0.082195-0.014533i Obs V Mod V

146 148 150 152 154 156

-0.25

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 Mooring E, u 2: rms error=0.061335 m/s Obs U Mod U

146 148 150 152 154 156

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15 v, bias:-0.063251-0.01523i Obs V Mod V