146 148 150 152 154 156

-0.1

-0.05

0

0.05

0.1

Velocity (m/s)

Mooring B, u 1: rms error=0.087968 m/s Obs U Mod U

146 148 150 152 154 156

-0.25

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 v, bias:-0.023042-0.06637i Obs V Mod V

146 148 150 152 154 156

-0.15

-0.1

-0.05

0

0.05

0.1 Mooring B, u 2: rms error=0.083475 m/s Obs U Mod U

146 148 150 152 154 156

-0.25

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 v, bias:-0.020629-0.053968i Obs V Mod V