148 150 152 154 156

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3

Velocity (m/s)

ADCP u 1: rms error=0.094694 m/s Obs U Mod U

148 150 152 154 156

-0.4

-0.2

0

0.2

0.4

0.6 v, bias:-0.039963-0.026527i Obs V Mod V

148 150 152 154 156

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 ADCP u 2: rms error=0.089389 m/s Obs U Mod U

148 150 152 154 156

-0.4

-0.2

0

0.2

0.4

0.6 v, bias:-0.039864-0.025478i Obs V Mod V