0 120 240 360 480 600

-71.5 -71 -70.5 -70 -69.5 -69 41

41.2

41.4

41.6

41.8

42

42.2

42.4

42.6

42.8

Longitude

Latitude

60 150

250 100 150 200

50 cm/s

Cape Ann

Massachusetts Bay

Cape Cod Bay

Cape Cod

Diffusivity (m^2/s)