-71.5 -71 -70.5 -70 -69.5 -69 41 41.2

41.4

41.6

41.8 42 42.2

42.4

42.6

42.8 43

Longitude

Latitude

(a)

Concentration (cells/liter) 0 40 80 120 160 200

-71.5 -71 -70.5 -70 -69.5 -69 41 41.2 41.4 41.6 41.8 42 42.2 42.4 42.6 42.8 43

Longitude

(b) exp23 Standard Error (cells/liter) 0 30 60 90 120 150