-68 -67.8 -67.6 -67.4 -67.2 -67

40.7

40.8

40.9 41 41.1

41.2

41.3

41.4

0.5 m/s

Observations: RMS = 0.4172 m/s 40 50 60

70 80 90 100 -68 -67.8 -67.6 -67.4 -67.2 -67

40.7

40.8

40.9 41 41.1

41.2

41.3

41.4

0.5 m/s

EN323_FC.15 Quoddy Sim 1: rms err=0.13557 m/s 40 50 60

70 80 90 100

-68 -67.8 -67.6 -67.4 -67.2 -67

40.7

40.8

40.9 41 41.1

41.2

41.3

41.4

0.5 m/s

EN323_FC.15 Quoddy Sim 2: rms err=0.087509 m/s 40 50 60

70 80 90 100 -68 -67.8 -67.6 -67.4 -67.2 -67

40.7

40.8

40.9 41 41.1

41.2

41.3

41.4

0.5 m/s

EN323_FC.15 Quoddy Sim 3: rms err=0.081471 m/s 40 50 60

70 80 90 100