1.4 1.6 1.8 2 2.2 2.4 x 10^5

-2.4

-2.2

-2

-1.8

-1.6

-1.4 x 10^5

1 m/s

../en302_data/en302_partial.m3d Observations: RMS = 0.42679 m/s

1.4 1.6 1.8 2 2.2 2.4 x 10^5

-2.4

-2.2

-2

-1.8

-1.6

-1.4 x 10^5

1 m/s

M2_wls.dat Inversion: RMS = 0.41187 m/s

1.4 1.6 1.8 2 2.2 2.4 x 10^5

-2.4

-2.2

-2

-1.8

-1.6

-1.4 x 10^5

0.1 m/s

Tidal Amplitude (m)

Inverse Error: RMS = 0.16648 m/s

0

0.2

0.4

0.6

0.8

1

1.2

1.4

1.4 1.6 1.8 2 2.2 2.4 x 10^5

-2.4

-2.2

-2

-1.8

-1.6

-1.4 x 10^5

0.1 m/s

Tidal Phaselag (deg gmt)

Inverse Error: RMS = 0.16648 m/s

120

150

180

210

240

270

300

330