-68.2 -68 -67.8 -67.6 -67.4 -67.2 -67 -66.8

41.6

41.7

41.8

41.9 42 42.1

42.2

Longitude

Latitude

EN324NF clim.01/CRUISE Q4.1

30 50

70 90 130

BANK150 grid

initial position final position

-68.2 -68 -67.8 -67.6 -67.4 -67.2 -67 -66.8

41.6

41.7

41.8

41.9 42 42.1

42.2

30 50

70 110 150 190

Longitude

Latitude

EN324NF clim.02/CRUISE Q4.1

GBK1 grid

initial position final position